-1.0.01.01.0.0-1.0UNCONFORMITY

RADIAL

VERTICAL

3HZ 0.15KM,

T 1 , T 2 =

0.01.0-1.0.01.01.0.0-1.0UNCONFORMITY

0.60KM,

0.01.0